; surface_quake2.def : Declares the module parameters for the DLL.

LIBRARY      "SURFACE_QUAKE2"
DESCRIPTION  'SURFACE_QUAKE2 Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
	Synapse_EnumerateInterfaces @1
