; imagem8.def : Declares the module parameters for the DLL.

LIBRARY      "ImageM8"
DESCRIPTION  'ImageM8 Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
	Synapse_EnumerateInterfaces @1
