; model.def : Declares the module parameters for the DLL.

LIBRARY      "MODEL"
DESCRIPTION  'MODEL Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
	Synapse_EnumerateInterfaces @1