; surface_heretic2.def : Declares the module parameters for the DLL.

LIBRARY      "Surface_Heretic2"
DESCRIPTION  'Surface_Heretic2 Windows Dynamic Link Library'

EXPORTS
    ; Explicit exports can go here
	Synapse_EnumerateInterfaces @1
